= LabInstance lua!
  

==  Quickstart

This is a quickstart guide of howto use this *LabInstance*

===  Default Configuration 

- Working Directory

> /home/docker/project

- Default user

> docker

- Default password

> docker

- Default password4root

> pass


== LabInstance Info


Lua (/ˈluːə/ LOO-ə; from Portuguese: lua [ˈlu.(w)ɐ] meaning moon)[a] is a lightweight, high-level, multi-paradigm programming language designed primarily for embedded use in applications. Lua is cross-platform, since the interpreter of compiled bytecode is written in ANSI C, and Lua has a relatively simple C API to embed it into applications.

Lua was originally designed in 1993 as a language for extending software applications to meet the increasing demand for customization at the time. It provided the basic facilities of most procedural programming languages, but more complicated or domain-specific features were not included; rather, it included mechanisms for extending the language, allowing programmers to implement such features. As Lua was intended to be a general embeddable extension language, the designers of Lua focused on improving its speed, portability, extensibility, and ease-of-use in development. 


== More info

https://www.lua.org/[^]


== RUN INSTANCE

Swarmlab services can be run in different ways. 

- You can run them **through the swarmlab hybrid environment** (http://docs.swarmlab.io/SwarmLab-HowTos/swarmlab/docs/swarmlab/docs/hybrid/start-microservices.html)
- or use them individually at will on the **command line of your system**


=== CLI

> git clone ...

> cd [DIRECTORY]


=== help

> make help


==== create service

> make create


=== start service

> make start


=== stop service

> make stop


=== list service

> make list


=== clean service

> make clean










