= LabInstance nginx!
  

==  Quickstart

This is a quickstart guide of howto use this *LabInstance*

===  Default Configuration 

- Working Directory

> /home/docker/project

- Default user

> docker

- Default password

> docker

- Default password4root

> pass


== LabInstance Info


Nginx (pronounced "engine X"[8] /ˌɛndʒɪnˈɛks/ EN-jin-EKS), stylized as NGINX, nginx or NginX, is a web server that can also be used as a reverse proxy, load balancer, mail proxy and HTTP cache. The software was created by Igor Sysoev and publicly released in 2004.[9] Nginx is free and open-source software, released under the terms of the 2-clause BSD license. A large fraction of web servers use NGINX,[10] often as a load balancer.

A company of the same name was founded in 2011 to provide support and Nginx Plus paid software. In March 2019, the company was acquired by F5 Networks for $670 million.

As of January 2021, Netcraft estimated that Apache served 24.63% of the million busiest websites, while Nginx served 23.21% and Microsoft Internet Information Services is in third place at 6.85% (for some of Netcraft's other stats Nginx is ahead of Apache), while according to W3Techs, Apache is ranked first at 35.0%, Nginx is ranked second at 33.0% and Cloudflare Server third at 17.3%.

== More info

https://www.nginx.com/[^]


== RUN INSTANCE

Swarmlab services can be run in different ways. 

- You can run them **through the swarmlab hybrid environment** (http://docs.swarmlab.io/SwarmLab-HowTos/swarmlab/docs/swarmlab/docs/hybrid/start-microservices.html)
- or use them individually at will on the **command line of your system**


=== CLI

> git clone ...

> cd [DIRECTORY]


=== help

> make help


==== create service

> make create


=== start service

> make start


=== stop service

> make stop


=== list service

> make list


=== clean service

> make clean










