With that out of the way lets enter the heart of our platform, 'my lab'! +

= My Lab
Nested under 'mylab' are both creation tools (bootstrap) and execution tools (run).

== The run menu

Inside the run menu there are three areas: ::

. 'Rub lab instance' +

. 'Enter lab room' +

. the console +

As the names suggest we can use the first to *run* one of our available lab instances, the second to *enter* a created labroom, and the third to *execute* scripts. +
Lets look at the options one by one. +
For the purpose of this walkthrough 'testmpi2' and 'test 18' were created. +
Since the console is explained along with the first area we dont feel there is a need to have seperate walkthrough.

=== Run lab instance area

include::../.{sourcedir}/navigation/lab_instances.adoc[]

=== Enter lab room area

include::../.{sourcedir}/navigation/lab_rooms.adoc[]
